1

14101^20

1

-90

-90

-14.4

0 -8.4502

-7.2

-7.2

0 -8.450

00

-7.2

221.76

0010.2

010001001010

555

0

1.21^{.2}1^{2.20}

2

-90

-90

-14.4

00

-7.2

-7.2

0 -7.2 0

270

-7.2

221.76

0 0 10.2

010001001010

555

0

1^{2.2}1^{2.2}1^{2.20}

3

-90

-90

-14.4

0 -7.2 0

-7.2

-7.2

0 0

00

270

-7.2

221.76

0010.2

010001001010

555

0